 ╔═════════╗      You are now in the help-function of the
 ╟─┐2 ┌────╢      Database transceiver of program IICTV.
 ║ │  │ ┌──╜
 ║ │  │ └──╖      For controlling any device in this database,
 ╟─┘  └────╢      do the following actions:
 ║  B U S  ║
 ╚═════════╝
    -> As you leave this HELP-function ("?") select a device
       by pressing the cursorkeys. (horizontal scroll)
    -> You can now enter new data for the internal registers
       of the device: simply enter a new value, followed by a <RETURN>.
    -> If the AUTOMATIC DEVICE UPDATE *) of this program is "on",
       every successful change will be transmitted to the IC.
       If it's "off" you may send register-setting to a device
       by pressing "<F3>" = transmit registers.
       The error-checking *) on I²C-bus transmissions in this program
       can be disabled by setting ERROR CHECKING "off".

*) Note : Setting/resetting AUTOMATIC DEVICE UPDATE and ERROR CHECKING
          can be done with MODE-SETTINGS. Leave this help-function and
          check the mode-settings by typing : Ctrl "O". (Control "O")